10 20 30 40 50 )c (GeV/ Tp 3−10

2−10

1−10

1 ε× Acc

Prompt D

Feed-down D

+π^+π^- K

→ ^+π^0 D

→ ^{*+}D

ALICE = 5.02 TeV NNs Pb, − 10% Pb −0

ALI-PUB-501904

ALI-PUB-501904